-- -----------------------------------
-- 修改 代码生成表字段类型
-- -----------------------------------
ALTER TABLE `blade_model_prototype`
    CHANGE COLUMN `comment` `jdbc_comment` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '注释说明' AFTER `jdbc_type`;
